
diff -r 88a01948450d -r d33698326409 testing_and_debugging/quickref.tex
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/testing_and_debugging/quickref.tex	Wed Dec 01 16:51:35 2010 +0530
@@ -0,0 +1,28 @@
+Skeleton of a test:\\
+{\ex \lstinline| if __name__ == '__main__':|}
+{\ex \lstinline|      result = gcd(48, 64) |}  
+{\ex \lstinline|      if result != 16:     |}
+{\ex \lstinline|           print ``Test Failed'' |}
+{\ex \lstinline|      print ``Test Passed''      |}
+
+
+\textbf{Testing}
+
+Get results from function or unit of code being tested.Compare it to original output. Test passed if they match else failed.
+
+\textbf{Code Style} 
+Four Space Indentation
+79 character limit on a line
+Funtions should be seperated by 
+blank line
+Use Docstring
+White space around operators 
+   
+Skeleton of try catch:\\
+{\ex \lstinline|     try:                  |}
+{\ex \lstinline|      	  num = int(a)     |}
+{\ex \lstinline|     except:               |}
+{\ex \lstinline|         print ``Wrong input...'' |}
+
+Starting debugger in ipython:\\
+{\ex \lstinline|     %debug                  |}




