
diff -r 672eaaab9204 -r 52d12eb31c30 web/hgbook/comments/sql/element.mysql.sql
--- a/web/hgbook/comments/sql/element.mysql.sql	Fri Feb 05 23:42:24 2010 +0530
+++ /dev/null	Thu Jan 01 00:00:00 1970 +0000
@@ -1,2 +0,0 @@
-alter table comments_element convert to character set utf8 collate utf8_bin;
-alter table comments_element default character set utf8 collate utf8_bin;




