
diff -r 672eaaab9204 -r 52d12eb31c30 SEESenv/web/hgbook/comments/sql/comment.mysql.sql
--- /dev/null	Thu Jan 01 00:00:00 1970 +0000
+++ b/SEESenv/web/hgbook/comments/sql/comment.mysql.sql	Fri Feb 12 01:11:21 2010 +0530
@@ -0,0 +1,2 @@
+alter table comments_comment convert to character set utf8 collate utf8_bin;
+alter table comments_comment default character set utf8 collate utf8_bin;




